-80 -60 -40 -20 0 20 40 60 80

-0.4

-0.2

0

0.2

0.4

0.6

0.8

latitude

P-E [mm/day]

Zonal Mean P-E

WA2025 - REF1960

GHG2025 - REF1960 sum of previous two

ALL2025 - REF1960