1970 2000 2030 2060 2090 -2 0 2 4 6 a. SAM

hPa

1970 2000 2030 2060 2090

-0.2

-0.1 0 0.1 0.2 0.3 0.4 b. V_{e,50S}

m2/s

1970 2000 2030 2060 2090 -5 0 5 10 15 c. Drake Transport

Year

Sv