240 220 200 180 160 140 ppt

12 10 8 6 4 ppt/yr

HCFC-22

NOAA AGAGE

A1 (2010)

24 22 20 18 16 14 12 10 ppt

1.5

1.0

0.5

0.0 ppt/yr

HCFC-141b

24 22 20 18 16 14 12 10 8 ppt

2012

2010

2008

2006

2004

2002

2000

1.6 1.4 1.2 1.0 0.8 0.6 0.4 0.2 ppt/yr

HCFC-142b