400

300

200

100

0 2010

2005

2000

1995

1990

1985

1980

CFC-11

57 (46-68)

2012 emissions (Gg)

AGAGE NOAA UNEP (2006)

700 600 500 400 300 200 100 0 2010

2005

2000

1995

1990

1985

1980

CFC-12

40 (26-54)

300 250 200 150 100 50 0 2010

2005

2000

1995

1990

1985

1980

CFC-113

1.5 (0-7)

25 20 15 10 5 0 2010

2005

2000

1995

1990

1985

1980

Halon-1211

4.8 (0.3-9.3)

AGAGE NOAA UEA (S.H.) UNEP (2011)

800

600

400

200

0 2010

2005

2000

1995

1990

1985

1980

CH3CCl3

2 (0-5)

40 30 20 10 0 2010

2005

2000

200

150

100

50

0 2010

2005

2000

1995

1990

1985

1980

CCl4

57 (40-74)

7 6 5 4 3 2 1 0 2010

2005

2000

1995

1990

1985

1980

Halon-1301

1.7 (1.4-2.0)

3.0 2.5 2.0 1.5 1.0 0.5 0.0 2010

2005

2000

1995

1990

1985

1980

Halon-2402

0.8 (0.3-1.2)

Global annual emissions (Gg yr^{-1})

20 15 10 5 0 2012

2008

2004

2000