150 100 50

2010

2005

2000

1995

1990

HFC-134a HFC-152a

20 15 10 5 0 2010

2005

2000

1995

1990

CF4 HFC-23

2.0 1.5 1.0 0.5 0.0 2010

2005

2000

1995

1990

C4F10 C5F12 C6F14 C7F16 C7F16 1.2 0.8 0.4 0.0 2010

2005

2000

1995

1990

NF3

4 3 2 1 0 2010

2005

2000

1995

1990

C2F6 C3F8

40

20

0 2010

2005

2000

1995

1990

HFC-143a HFC-125 HFC-32 10 8 6 4 2 0 2010

2005

2000

1995

1990

HFC-245fa HFC-365mfc

4 3 2 1 0 2010

2005

2000

1995

1990

HFC-227ea HFC-236fa

10 8 6 4 2 0 2010

2005

2000

1995

1990

SF6 _{SO} 2F2

Global emissions (Gg yr^{-1})