3.5 3.0 2.5 2.0 1.5 1.0 2010

2005

2000

1995

1990 halon-1301

110 105 100 95 90 85 80 75 2010

2005

2000

1995

1990

CCl4

10 9 8 7

2010

2005

2000

1995

1990

CH3Br

240 200 160 120 80 2010

2005

2000

1995

1990

HCFC-22

600 580 560 540 520 500 2010

2005

2000

1995

1990

CH3Cl

12 10 8 6 4 2012

2010

2008

Global surface mole fraction (pmol mol,^{-1} parts per trillion, or ppt)

140 120 100 80 60 40 20 0 2010

2005

2000

1995

1990

CH3CCl3

0.5 0.4 0.3 0.2 2010

2005

2000

1995

1990 halon-2402

4.5 4.0 3.5 3.0 2.5 2.0 2010

2005

2000

1995

1990 halon-1211

NOAA AGAGE UEA (S.H.)

A1-2010 A1-2006