1000 800 600 400 200 0

Tropospheric Bromine as ECl (ppt)

2010

2005

2000

1995

1990

20 15 10 5 0

Tropospheric Bromine (ppt) from halons halons + CH3Br as ECl

0.6 0.4 0.2 0.0 -0.2

Yearly Change (ppt)

2010

2005

2000

1995

1990