3700

3600

3500

3400

3300

3200

Tropospheric Chlorine (ppt)

AGAGE NOAA

A1 (2006) A1 (2010)

-1.5

-1.0

-0.5 0.0 0.5 1.0 1.5

Yearly Change (%)

2010

2005

2000

1995

1990