30 25 20 15 10 5 0

CH2Cl2, CHCl3 (ppt)

2010

2005

2000

1995

3.0 2.5 2.0 1.5 1.0 0.5 0.0

CCl2CCl2 (ppt)

CHCl3

CCl2CCl2

CH2Cl2

NOAA AGAGE